Gain amp vs UTC time for J1157+1638.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 28-MAY-2002 15:03:01

1R EF 1.4 1.2 1.0 2R WB 1.4 1.2 1.0 3R ON 1.4 1.2 1.0 4R MC 10 5 0 5R JB

1.05 1.00 0.95 0.90 0.85

6R TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08

4 3 2 1

Gain amp vs UTC time for J1157+1638.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 28-MAY-2002 15:03:05

1R EF 1.4 1.2 1.0 2R WB 1.3 1.2 1.1 1.0 0.9 3R ON 1.3 1.2 1.1 1.0 0.9 4R MC 30 20 10 0 5R JB 1.1 1.0 0.9 6R TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08

5 4 3 2 1

Gain amp vs UTC time for J1157+1638.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 28-MAY-2002 15:03:09

1L EF 1.2 1.0 0.8 2L WB 1.4 1.2 1.0 0.8 3L ON 3.0 2.5 2.0 4L MC 4 2 0 5L JB 2.0 1.5 1.0 0.5 6L TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08

3 2 1

Gain amp vs UTC time for J1157+1638.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 28-MAY-2002 15:03:13

1L EF 8 6 4 2 2L WB 1.4 1.2 1.0 3L ON 15 10 5 4L MC 8 6 4 2 0 5L JB 2.0 1.5 1.0 6L TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08

4 3 2 1

Gain amp vs UTC time for J0657.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 28-MAY-2002 15:09:44

1R EF

1.05 1.00 0.95

2R WB

1.10 1.05 1.00

3R ON

0.90 0.85 0.80 0.75

4R MC 4 3 2 1 5R JB

1.10 1.05 1.00 0.95

6R TR

Gain

TIME (HOURS)

20 30 21 00 30 22 00 30 23 00 30

1.5 1.4 1.3 1.2 1.1

Gain amp vs UTC time for J0657.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 28-MAY-2002 15:09:49

1R EF

1.05 1.00 0.95

2R WB

1.10 1.05 1.00

3R ON

0.95 0.90 0.85 0.80 0.75

4R MC 20 10 0 5R JB

1.10 1.05 1.00 0.95

6R TR

Gain

TIME (HOURS)

20 30 21 00 30 22 00 30 23 00 30

2.0 1.8 1.6 1.4 1.2

Gain amp vs UTC time for J0657.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 28-MAY-2002 15:09:53

1L EF 1.00 0.95 0.90

2L WB

1.05 1.00 0.95

3L ON 1.6 1.5 1.4 4L MC 1.0 0.8 0.6 5L JB

0.85 0.80 0.75 0.70

6L TR

Gain

TIME (HOURS)

20 30 21 00 30 22 00 30 23 00 30

1.1 1.0 0.9

Gain amp vs UTC time for J0657.MULTI.1

SN 2 Lpol IF 2

Plot file version 4 created 28-MAY-2002 15:09:57

1L EF

1.04 1.02 1.00 0.98 0.96 0.94

2L WB

1.08 1.06 1.04 1.02 1.00 0.98

3L ON 1.7 1.6 1.5 1.4 4L MC 1.0 0.8 0.6 5L JB 1.6 1.4 1.2 6L TR

Gain

TIME (HOURS)

20 30 21 00 30 22 00 30 23 00 30

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for 1613+341.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 28-MAY-2002 15:15:49

1R EF

1100 1050 1000

2R WB

1100 1050 1000 950 3R ON

1300 1200 1100

4R MC

1600 1400 1200 1000 800 5R JB 1050 1000 950 6R TR

MilliGain

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

1300 1200 1100 1000

Gain amp vs UTC time for 1613+341.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 28-MAY-2002 15:15:53

1R EF

1050 1000 950 2R WB

1100 1050 1000 950 3R ON

1300 1200 1100

4R MC

1200 1000 800 600 5R JB

1100 1050 1000 950 6R TR

MilliGain

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

1400 1300 1200 1100

Gain amp vs UTC time for 1613+341.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 28-MAY-2002 15:15:57

1L EF

1.05 1.00 0.95 0.90

2L WB

1.05 1.00 0.95 0.90

3L ON 2.3 2.2 2.1 2.0 1.9 4L MC 1.5 1.0 0.5 5L JB

0.85 0.80 0.75

6L TR

Gain

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

1.1 1.0 0.9 0.8

Gain amp vs UTC time for 1613+341.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 28-MAY-2002 15:16:01

1L EF

1.05 1.00 0.95 0.90

2L WB

1.10 1.05 1.00 0.95

3L ON 2.3 2.2 2.1 2.0 4L MC

0.55 0.50 0.45 0.40 0.35

5L JB 1.3 1.2 1.1 6L TR

Gain

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

1.1 1.0 0.9