Center at RA 11 57 34.83627 DEC 16 38 59.6503

CONT: J1157+16 IPOL 1372.602 MHZ J1157+1638.ICL001.4

PLot file version 1 created 28-MAY-2002 15:06:40

Cont peak flux = 6.5521E-01 JY/BEAM Levs = 6.552E-01 * (-0.014, 0.014, 0.028, 0.055, 0.110, 0.220, 0.441, 0.882)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250