Gain amp vs UTC time for er012c.MSORT.1 CL 4 Rpol IF 1

Plot file version 2 created 28-MAY-2002 18:28:47

1R EF 6 5 4 2R WB 7 6 5 3R ON 25 20 15 4R MC 400 200 0 5R JB 9 8 7 6 6R TR

Gain

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

80 60 40 20

Gain amp vs UTC time for er012c.MSORT.1 CL 4 Rpol IF 2

Plot file version 3 created 28-MAY-2002 18:28:51

1R EF 6 5 4 2R WB 8 7 6 5 3R ON 20 15 4R MC 600 400 200 0 5R JB 9 8 7 6R TR

Gain

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

60 40 20

Gain amp vs UTC time for er012c.MSORT.1 CL 4 Lpol IF 1

Plot file version 4 created 28-MAY-2002 18:28:55

1L EF 6 5 4 3 2L WB 8 6 4 3L ON 40 30 20 4L MC 150 100 50 0 5L JB 30 20 10 6L TR

Gain

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

80 60 40 20

Gain amp vs UTC time for er012c.MSORT.1 CL 4 Lpol IF 2

Plot file version 5 created 28-MAY-2002 18:28:59

1L EF 30 20 10 2L WB 8 7 6 5 3L ON 200 150 100 50 4L MC 200 100 0 5L JB

1816 1412 108 6L TR

Gain

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

60 40 20