Delay vs UTC time for er014.MSORT.1 SN 2 Rpol IF 1

Plot file version 1 created 11-MAR-2003 17:44:24

1R CM 2 0 -2 -4 2R EB 0.1 0.0 -0.1 3R WB 33 32 31 30 5R ON 5.6 5.4 5.2 5.0 6R MC 22 21 20 7R NT

Nano Seconds

39 38 37 36 35 8R TR

TIME (HOURS)

10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

38 37 36

Delay vs UTC time for er014.MSORT.1 SN 2 Rpol IF 2

Plot file version 2 created 11-MAR-2003 17:44:24

1R CM 42 40 38 2R EB 0.1 0.0 -0.1 3R WB 42 41 40 5R ON 9.0 8.8 8.6 6R MC 25 24 23 7R NT

Nano Seconds

26 25 24 23 8R TR

TIME (HOURS)

10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

37 36 35

Delay vs UTC time for er014.MSORT.1 SN 2 Lpol IF 1

Plot file version 3 created 11-MAR-2003 17:44:24

1L CM -21 -22 -23 -24 -25 2L EB 0.1 0.0 -0.1 3L WB 8 7 6 5 5L ON

-8.0

-8.5

-9.0

6L MC 0 -1 -2 7L NT

Nano Seconds

-3 -4 -5 -6 -7 8L TR

TIME (HOURS)

10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

0.7 0.6 0.5 0.4 0.3

Delay vs UTC time for er014.MSORT.1 SN 2 Lpol IF 2

Plot file version 4 created 11-MAR-2003 17:44:25

1L CM -16 -17 -18 2L EB

0.05 0.00 -0.05

3L WB 17 16 15 5L ON

-9.0 -9.2 -9.4

6L MC 1 0 -1 7L NT

Nano Seconds

-5 -6 -7 -8 8L TR

TIME (HOURS)

10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

-3.8 -4.0 -4.2 -4.4