Center at RA 00 42 19.45173 DEC 57 08 36.5859

CONT: 0042+570 IPOL 22228.310 MHZ 0042+570.IIM001.1

PLot file version 1 created 28-JUL-2004 14:50:17

Cont peak flux = 2.3481E-01 JY/BEAM Levs = 2.348E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40