Center at RA 00 59 52.20000 DEC 58 12 24.0000

CONT: 0056+579 IPOL 22228.310 MHZ 0056+579.IIM001.2

PLot file version 1 created 28-JUL-2004 14:50:35

Cont peak flux = 1.6953E-01 JY/BEAM Levs = 1.695E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40