Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 15:02:25

1R CM 1010 1005 1000 995 1L CM 1010 1005 1000 995 2R EF 975 970 965 960 2L EF

1015 1010 1005 1000

3R JB 960 955 950 945 3L JB

MilliGain

1085 1080 1075 1070

4L ON 510 505 500 495 6R NT 955 950 945 940 6L NT 1085 1080 1075 1070 9R MH

TIME (HOURS)

12 46 27.0 27.5 28.0 28.5 29.0

990 985 980 975