Gain phs vs UTC time for 3C84.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 15:01:41

1R CM

-5.015 -5.020 -5.025 -5.030

1L CM

6.875 6.870 6.865 6.860

2R EF

0.010 0.005 0.000 -0.005

2L EF

0.010 0.005 0.000 -0.005

3R JB -1.645 -1.650 -1.655 -1.660

3L JB

Degrees

1.915 1.910 1.905 1.900

4R ON

-6.115 -6.120 -6.125 -6.130

4L ON

0.395 0.390 0.385 0.380

6R NT

-2.000 -2.005 -2.010 -2.015

6L NT

TIME (HOURS)

12 46 27.0 27.5 28.0 28.5 29.0

2.480 2.475 2.470 2.465

Gain phs vs UTC time for 3C84.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 2 created 28-JUL-2004 15:01:41

9R MH

Degrees

TIME (HOURS)

12 46 27.0 27.5 28.0 28.5 29.0

0.395 0.390 0.385 0.380