Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 15:30:45

1R CM 920 915 910 905 1L CM

1160 1155 1150 1145

3R JB 940 935 930 925 3L JB

1215 1210 1205 1200

4L ON 760 755 750 745 6R NT

MilliGain

875 870 865 860 6L NT

1070 1065 1060 1055

9R MH 945 940 935 930 9L MH

TIME (HOURS)

23 19 19.0 19.5 20.0 20.5 21.0

1100 1095 1090 1085