Gain phs vs UTC time for 3C84.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 15:29:30

1R CM

-4.775 -4.780 -4.785 -4.790

1L CM

3.175 3.170 3.165 3.160

3R JB

0.010 0.005 0.000 -0.005

3L JB

0.010 0.005 0.000 -0.005

4L ON

0.875 0.870 0.865 0.860

6R NT

Degrees

0.545 0.540 0.535 0.530

6L NT -0.380 -0.385 -0.390 -0.395

9R MH

1.170 1.165 1.160 1.155

9L MH

TIME (HOURS)

23 19 19.0 19.5 20.0 20.5 21.0

-0.680 -0.685 -0.690 -0.695