Center at RA 03 19 48.16010 DEC 41 30 42.1031

CONT: 3C84 IPOL 22225.950 MHZ 3C84.ICL001.5

PLot file version 1 created 28-JUL-2004 15:36:58

Cont peak flux = 8.3876E-01 JY/BEAM Levs = 8.388E-01 * (-0.079, 0.079, 0.158, 0.316, 0.631)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40