Gain amp vs UTC time for er017_2.TMP.1 CL 4 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 15:37:02

1R CM

24.405 24.400 24.395 24.390

1L CM

30.795 30.790 30.785 30.780 3R JB

25.5 25.0 24.5 24.0 3L JB

25.5 25.0 24.5 24.0 23.5 4L ON 39 38 37 6R NT

Gain

30 28 26 6L NT 36 34 32 30 9R MH 50 49 48 47 9L MH

TIME (HOURS)

14 16 18 20 22 1/00 1/02

50 49 48