Gain phs vs UTC time for 0526+373.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 16:01:24

1L CM

4.950 4.945 4.940 4.935

3L JB

0.010 0.005 0.000 -0.005

8R SH -10.630 -10.635 -10.640 -10.645 8L SH 3.425 3.420 3.415 3.410

9L MH

Degrees

TIME (HOURS)

14 42 35.0 35.5 36.0 36.5 37.0

-41.030 -41.035 -41.040 -41.045