Center at RA 05 30 12.70000 DEC 37 23 32.0000

CONT: 0526+373 IPOL 22225.870 MHZ 0526+373.IIM001.1

PLot file version 1 created 28-JUL-2004 15:54:14

Cont peak flux = -1.0864E-01 JY/BEAM Levs = 8.752E-02 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40