Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 16:00:58

1R CM 0.86 0.84 0.82 0.80 1L CM 1.15 1.10 1.05 2R EF 0.93 0.92 0.91 2L EF

0.80 0.79 0.78 0.77 3R JB

0.93 0.92 0.91 0.90 0.89 3L JB

Gain

1.05 1.04 1.03

4L ON

0.46 0.44 0.42 0.40 6R NT

1.025 1.020 1.015

6L NT

1.430 1.425 1.420 1.415 8R SH

TIME (HOURS)

14 37 30 45 38 00 15 30 45 39 00

1.215 1.210 1.205 1.200

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 28-JUL-2004 16:00:58

8L SH

1.30 1.25 1.20 1.15 9R MH

0.975 0.970 0.965

9L MH

Gain

TIME (HOURS)

14 37 30 45 38 00 15 30 45 39 00

1.5 1.4 1.3