Gain phs vs UTC time for 0528+134.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 1 created 28-JUL-2004 16:28:26

1R CM

-0.210 -0.215 -0.220 -0.225 1L CM

4.055 4.050 4.045 4.040 2R EF

0.010 0.005 0.000 -0.005

2L EF

0.010 0.005 0.000 -0.005

3R JB

2.180 2.175 2.170 2.165 3L JB

Degrees

1.045 1.040 1.035 1.030 4L ON

-5.585 -5.590 -5.595 -5.600

8R SH

8.180 8.175 8.170 8.165

8L SH

-10.355 -10.360 -10.365 -10.370 9R MH

TIME (HOURS)

17 00 30 18 00 30 19 00 30 20 00 30

4.555 4.550 4.545 4.540