Plot file version 1 created 28-JUL-2004 16:31:56 V vs U for 0528+134.MULTI.1 Source:0528+134 Ants * - * Stokes I IF# 1 Chan# 1

Freq = 22.2240 GHz, Bw = 16.000 MHz

Giga Wavlngth

Giga Wavlngth

-0.6 -0.4 -0.2 0.0 0.2 0.4 0.6

0.6

0.4

0.2

0.0

-0.2

-0.4

-0.6