Center at RA 06 43 26.30000 DEC 08 57 38.0000

CONT: 0640+090 IPOL 22224.030 MHZ 0640+090.ICL001.5

PLot file version 1 created 28-JUL-2004 16:31:59

Cont peak flux = 3.1306E-01 JY/BEAM Levs = 3.131E-01 * (-0.043, 0.043, 0.086, 0.173, 0.345, 0.691)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40