Center at RA 06 07 59.69924 DEC -08 34 49.9781

CONT: 0607-083 IPOL 22223.400 MHZ 0607-083.ICL001.5

PLot file version 1 created 28-JUL-2004 17:08:32

Cont peak flux = 3.6522E-01 JY/BEAM Levs = 3.652E-01 * (-0.016, 0.016, 0.033, 0.065, 0.131, 0.261, 0.522)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40