Center at RA 00 19 45.78643 DEC 73 27 30.0174

CONT: 0016+731 IPOL 4986.896 MHZ 0016+731.ICL001.3

PLot file version 1 created 28-NOV-2002 19:01:43

Cont peak flux = 4.3399E-01 JY/BEAM Levs = 4.340E-01 * (-0.028, 0.028, 0.056, 0.111, 0.223, 0.446, 0.891)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100