Center at RA 04 32 36.50300 DEC 41 38 28.4300

CONT: 0429+415 IPOL 4986.896 MHZ 0429+415.ICL001.3

PLot file version 1 created 28-NOV-2002 19:04:20

Cont peak flux = 1.9728E+00 JY/BEAM Levs = 1.973E+00 * (-0.012, 0.012, 0.024, 0.047, 0.095, 0.189, 0.378, 0.757)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100