Center at RA 13 31 08.28807 DEC 30 30 32.9598

CONT: 1328+307 IPOL 4986.896 MHZ 1328+307.ICL001.3

PLot file version 1 created 28-NOV-2002 19:07:50

Cont peak flux = -2.6406E+00 JY/BEAM Levs = 7.686E-01 * (-1.30, 1.301)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100