Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 28-NOV-2002 19:00:43

1R JB

0.92 0.90 0.88 0.86 0.84

2R MC

0.95

0.90

0.85 3R EF

1.02 1.00 0.98 0.96 0.94 4R ON

0.85 0.84 0.83 0.82 0.81

5R NT

1.16 1.14 1.12 1.10 1.08 6R TR

Gain

5.0 4.5 4.0 7R SH

4.595 4.590 4.585 4.580

9R WB

TIME (HOURS)

20 21 22 23 1/00

1.2 1.1 1.0 0.9

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 28-NOV-2002 19:00:43

1R JB 2.4 2.3 2.2 2R MC

0.95 0.90

3R EF

1.05 1.00 0.95 4R ON

0.88 0.86 0.84 0.82 5R NT

1.15 1.10 1.05

6R TR

Gain

0.80 0.75 0.70 0.65

9R WB

TIME (HOURS)

20 21 22 23 1/00

1.2 1.1 1.0 0.9

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 28-NOV-2002 19:00:44

1R JB

1.00

0.95

0.90

2R MC 1.00 0.95 0.90

3R EF

1.05

1.00

0.95

4R ON

0.90 0.88 0.86 0.84 0.82

5R NT

0.84 0.82 0.80 0.78 0.76

6R TR

Gain

1.30 1.25 1.20 1.15

7R SH

5.150 5.145 5.140 5.135

9R WB

TIME (HOURS)

20 21 22 23 1/00

1.1 1.0 0.9 0.8

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 28-NOV-2002 19:00:44

1R JB

0.95

0.90

0.85

2R MC

0.98 0.96 0.94 0.92 0.90

3R EF 1.00 0.95 0.90

4R ON

0.90 0.88 0.86 0.84 0.82

5R NT

1.35 1.30 1.25 1.20

6R TR

Gain

5 4 3 2 1 7R SH

4.870 4.865 4.860 4.855

9R WB

TIME (HOURS)

20 21 22 23 1/00

1.2 1.1 1.0 0.9

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 28-NOV-2002 19:00:44

1L JB 850 840 830 820 2L MC

1000 900 800 3L EF

1080 1060 1040

4L ON

1000 980 960 5L NT

1080 1060 1040 1020 1000 980 6L TR

MilliGain

800 700 600 7L SH 800 700 600 9L WB

TIME (HOURS)

20 21 22 23 1/00

1005 1000 995 990

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 28-NOV-2002 19:00:44

1L JB

1150 1100 1050

2L MC 1000 950 3L EF 1000 950 4L ON

1120 1100 1080 1060

5L NT

1080 1060 1040 1020 1000980

6L TR

MilliGain

900 800 700 7L SH 580 560 540 9L WB

TIME (HOURS)

20 21 22 23 1/00

1200

1000 800

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 28-NOV-2002 19:00:45

1L JB 950 900 850 2L MC

1000 950 900 3L EF

1000 950 900 4L ON

1150 1100 1050 1000

5L NT 950 900 850 6L TR

MilliGain

860 840 820 800 780 7L SH 640 620 600 9L WB

TIME (HOURS)

20 21 22 23 1/00

1200 1100 1000 900

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 28-NOV-2002 19:00:45

1L JB 920 900 880 860 840 2L MC

1000 900 800 3L EF 1040 1020 1000

4L ON

1020

1000 980 5L NT 820 800 780 760 740 720 6L TR

MilliGain

900 800 700 600 7L SH 700 650 600 550 9L WB

TIME (HOURS)

20 21 22 23 1/00

1100 1000 900 800

Gain amp vs UTC time for 0016+731.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 28-NOV-2002 19:01:29

1R JB

0.96 0.94 0.92 0.90

2R MC

1.00 0.98 0.96 0.94

3R EF

1.05 1.00 0.95 0.90

4R ON 0.9 0.8 0.7 5R NT 1.3 1.2 1.1 6R TR

Gain

6.0 5.5 5.0 9R WB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1.2 1.1 1.0

Gain amp vs UTC time for 0016+731.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 28-NOV-2002 19:01:29

1R JB

2.45 2.40 2.35 2.30

2R MC

0.98 0.96 0.94

3R EF

1.05 1.00 0.95

4R ON 0.9 0.8 0.7 5R NT

1.25 1.20 1.15 1.10 1.05

6R TR

Gain

1.1 1.0 0.9 0.8 9R WB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1.15 1.10 1.05 1.00 0.95

Gain amp vs UTC time for 0016+731.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 28-NOV-2002 19:01:29

1R JB 1000 950 900 2R MC

1050 1000 950 3R EF

1050

1000 950 4R ON 900 800 700 5R NT 860 840 820 800 6R TR

MilliGain

1240 1220 1200

9R WB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1080 1060 1040 1020 1000980

Gain amp vs UTC time for 0016+731.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 28-NOV-2002 19:01:29

1R JB

1.05 1.00 0.95 0.90

2R MC

1.00 0.95 0.90

3R EF

1.05 1.00 0.95 0.90

4R ON 1.0 0.9 0.8 0.7 5R NT 1.5 1.4 1.3 6R TR

Gain

1.05 1.00 0.95 0.90 0.85

9R WB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1.2 1.1 1.0

Gain amp vs UTC time for 0016+731.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 28-NOV-2002 19:01:30

1L JB

1000 950 900 2L MC

1000 950 900 3L EF

1020 1000980 960940 920 4L ON

1000 900 800 5L NT

1000 980 960 940 920 6L TR

MilliGain

880 870 860 7L SH

1115 1110 1105 1100 1095 9L WB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1100 1050 1000

Gain amp vs UTC time for 0016+731.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 28-NOV-2002 19:01:30

1L JB 960 940 920 900 880 2L MC

1100

1000 900 3L EF

1050 1000 950 4L ON

1100 1000 900 800 700 5L NT 900 850 800 750 6L TR

MilliGain

950 900 850 800 7L SH 880 860 840 9L WB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1065 1060 1055 1050

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 28-NOV-2002 19:03:36

1R JB 1.4 1.2 1.0 2R MC 1.2 1.1 1.0 0.9 3R EF 1.3 1.2 1.1 1.0 0.9 4R ON 1.4 1.2 1.0 0.8 5R NT 1.6 1.4 1.2 6R TR

Gain

9 8 7 6 5 7R SH 8 6 4 9R WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

15 10 5 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 28-NOV-2002 19:03:36

1R JB 4.0 3.5 3.0 2.5 2R MC 1.2 1.0 0.8 3R EF 1.3 1.2 1.1 1.0 0.9 4R ON 1.4 1.2 1.0 0.8 5R NT 1.5 1.4 1.3 1.2 1.1 6R TR

Gain

1.4 1.2 1.0 0.8 9R WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

400 200 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 28-NOV-2002 19:03:36

1R JB 1.6 1.4 1.2 1.0 2R MC 1.3 1.2 1.1 1.0 0.9 3R EF 1.3 1.2 1.1 1.0 0.9 4R ON 1.4 1.2 1.0 5R NT 1.1 1.0 0.9 0.8 6R TR

Gain

1.6 1.4 1.2 7R SH 9 8 7 6 5 9R WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

150 100 50 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 28-NOV-2002 19:03:36

1R JB 1.6 1.4 1.2 1.0 2R MC 1.3 1.2 1.1 1.0 0.9 3R EF 1.2 1.1 1.0 0.9 4R ON 1.4 1.2 1.0 0.8 5R NT 1.8 1.6 1.4 6R TR

Gain

40 20 0 7R SH 12 10 8 6 4 9R WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

600 400 200 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 28-NOV-2002 19:03:37

1L JB 1.6 1.4 1.2 1.0 0.8 2L MC 1.3 1.2 1.1 1.0 0.9 3L EF 1.2 1.1 1.0 4L ON 1.6 1.4 1.2 1.0 5L NT 1.5 1.4 1.3 1.2 1.1 6L TR

Gain

1.5 1.0 7L SH 1.6 1.4 1.2 1.0 0.8 0.6 9L WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

60 40 20 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 28-NOV-2002 19:03:37

1L JB 1.8 1.6 1.4 1.2 1.0 2L MC 1.3 1.2 1.1 1.0 0.9 3L EF 1.3 1.2 1.1 1.0 0.9 4L ON 1.6 1.4 1.2 5L NT 1.4 1.2 1.0 6L TR

Gain

6 4 2 7L SH 1.4 1.2 1.0 0.8 0.6 9L WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

15 10 5 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 28-NOV-2002 19:03:37

1L JB 1.4 1.2 1.0 0.8 2L MC 1.2 1.1 1.0 0.9 3L EF 1.2 1.0 0.8 4L ON 1.6 1.4 1.2 1.0 5L NT 1.3 1.2 1.1 1.0 0.9 6L TR

Gain

4 3 2 1 7L SH 60 40 20 0 9L WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

200 100 0

Gain amp vs UTC time for 0429+415.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 28-NOV-2002 19:03:37

1L JB 2.0 1.5 1.0 2L MC 1.3 1.2 1.1 1.0 3L EF 1.2 1.1 1.0 0.9 4L ON 3 2 1 5L NT 1.0 0.9 0.8 6L TR

Gain

1.2 1.0 0.8 7L SH 1.4 1.2 1.0 0.8 0.6 9L WB

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02

15 10 5 0