IF 1 CHAN 1 STK LL of 3C286.ICL001.3

Ampltude andPhase vs Time for 3C286.MULTI.1 CL # 3

PLot file version 1 created 29-JUL-2002 14:01:31

4 2 0

EF - MC ( 1 - 3 )

100 0 -100

Janskys

4 2 0

EF - TR ( 1 - 4 )

100 0 -100 4 2 0

EF - ON ( 1 - 6 )

Degrees

TIME (HOURS)

23 47 00 30 48 00 30 49 00 30

100 0 -100

IF 2 CHAN 1 STK LL of 3C286.ICL001.3

Ampltude andPhase vs Time for 3C286.MULTI.1 CL # 3

PLot file version 2 created 29-JUL-2002 14:01:31

4 2 0

EF - MC ( 1 - 3 )

100 0 -100

Janskys

4 2 0

EF - TR ( 1 - 4 )

100 0 -100 4 2 0

EF - ON ( 1 - 6 )

Degrees

TIME (HOURS)

23 47 00 30 48 00 30 49 00 30

100 0 -100

IF 1 CHAN 1 STK RR of 3C286.ICL001.3

Ampltude andPhase vs Time for 3C286.MULTI.1 CL # 3

PLot file version 3 created 29-JUL-2002 14:01:32

4 2 0

EF - MC ( 1 - 3 )

100 0 -100

Janskys

4 2 0

EF - TR ( 1 - 4 )

100 0 -100 4 2 0

EF - ON ( 1 - 6 )

Degrees

TIME (HOURS)

23 47 00 30 48 00 30 49 00 30

100 0 -100

IF 2 CHAN 1 STK RR of 3C286.ICL001.3

Ampltude andPhase vs Time for 3C286.MULTI.1 CL # 3

PLot file version 4 created 29-JUL-2002 14:01:32

4 2 0

EF - MC ( 1 - 3 )

100 0 -100

Janskys

4 2 0

EF - TR ( 1 - 4 )

100 0 -100 4 2 0

EF - ON ( 1 - 6 )

Degrees

TIME (HOURS)

23 47 00 30 48 00 30 49 00 30

100 0 -100