Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 29-JUL-2002 13:58:27

1R EF

1075 1070 1065 1060

2R JB 685 680 675 670 3R MC

1080 1070 1060

4R TR

1110 1100 1090

5R WB

1024 1022 1020 1018 1016 1014 6R ON

MilliGain

TIME (HOURS)

1/01 34 00 15 30 45 35 00 15 30 45 36 00

970 965 960

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 29-JUL-2002 13:58:27

1R EF

1040 1035 1030 1025

2R JB 670 665 660 655 3R MC

1080

1070

1060

4R TR 940 930 920 910 5R WB 930 925 920 915 6R ON

MilliGain

TIME (HOURS)

1/01 34 00 15 30 45 35 00 15 30 45 36 00

925 920 915 910

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 29-JUL-2002 13:58:27

1L EF 935 930 925 920 2L JB 680 675 670 665 3L MC 880 860 840 4L TR 930 920 910 5L WB 970 960 950 6L ON

MilliGain

TIME (HOURS)

1/01 34 00 15 30 45 35 00 15 30 45 36 00

980 970 960 950

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 29-JUL-2002 13:58:28

1L EF 985 980 975 970 965 2L JB 840 835 830 825 3L MC 900 890 880 4L TR 940 930 920 5L WB 925 920 915 6L ON

MilliGain

TIME (HOURS)

1/01 34 00 15 30 45 35 00 15 30 45 36 00

945 940 935 930 925

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 29-JUL-2002 14:00:35

1R EF

1040 1035 1030 1025

2R JB 920 915 910 905 3R MC

1135 1130 1125 1120

4R TR

1010 1005 1000 995 5R WB

1090 1085 1080 1075

6R ON

MilliGain

TIME (HOURS)

23 48 08.0 08.5 09.0 09.5

980 975 970 965

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 29-JUL-2002 14:00:35

1R EF

1055 1050 1045 1040

2R JB 975 970 965 960 3R MC

1085 1080 1075 1070

4R TR 995 990 985 980 5R WB 970 965 960 955 6R ON

MilliGain

TIME (HOURS)

23 48 08.0 08.5 09.0 09.5

990 985 980 975

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 29-JUL-2002 14:00:35

1L EF 930 925 920 915 2L JB 950 945 940 935 3L MC 905 900 895 890 4L TR 965 960 955 950 5L WB

1000 995 990 985 6L ON

MilliGain

TIME (HOURS)

23 48 08.0 08.5 09.0 09.5

975 970 965 960

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 29-JUL-2002 14:00:35

1L EF

1000 995 990 985 2L JB

1225 1220 1215 1210

3L MC 895 890 885 880 4L TR

1010 1005 1000 995 5L WB 950 945 940 935 6L ON

MilliGain

TIME (HOURS)

23 48 08.0 08.5 09.0 09.5

1010 1005 1000 995

Gain amp vs UTC time for JVS1506+37.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 29-JUL-2002 14:02:01

1R EF

0.98 0.96 0.94 0.92 0.90 0.88

2R JB

0.800 0.795 0.790 0.785

3R MC 1.0 0.9 0.8 4R TR 1.2 1.1 1.0 5R WB 4 3 2 1 6R ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

0.9 0.8 0.7

Gain amp vs UTC time for JVS1506+37.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 29-JUL-2002 14:02:02

1R EF 8 6 4 2 2R JB

0.880 0.875 0.870 0.865

3R MC 1.0 0.9 0.8 4R TR 2.0 1.5 1.0 5R WB 4 3 2 1 6R ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

0.9 0.8 0.7

Gain amp vs UTC time for JVS1506+37.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 29-JUL-2002 14:02:02

1L EF 2.0 1.5 1.0 2L JB

0.80 0.79 0.78

3L MC 0.8 0.7 0.6 4L TR 1.2 1.0 0.8 5L WB 1.1 1.0 0.9 0.8 6L ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

0.9 0.8 0.7 0.6

Gain amp vs UTC time for JVS1506+37.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 29-JUL-2002 14:02:02

1L EF 2.0 1.5 1.0 2L JB

1.09 1.08 1.07

3L MC

0.85 0.80 0.75 0.70 0.65

4L TR 1.1 1.0 0.9 5L WB 1.0 0.9 0.8 6L ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

0.9 0.8 0.7

Gain amp vs UTC time for JVS1215+34.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 29-JUL-2002 14:03:21

1L EF

1000 950 900 2L JB

1050 1000 950 900 3L MC

1000 900 800 4L TR

1200

1100

1000 5L WB 1100 1050 1000 6L ON

MilliGain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1000 980 960 940 920

Gain amp vs UTC time for JVS1215+34.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 29-JUL-2002 14:03:22

1L EF

1100 1050 1000

2L JB

1400 1300 1200

3L MC

1000 950 900 850 4L TR

1200 1150 1100

5L WB

1040 1020 1000 980 960 940 6L ON

MilliGain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1040 1020 1000 980

Gain amp vs UTC time for JVS1349+53.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 29-JUL-2002 14:04:13

1R EF

0.55 0.50 0.45 0.40 2R JB 0.5 0.4 0.3 3R MC 2.5 2.0 1.5 1.0 0.5 4R TR 8 6 4 2 0 5R WB

0.55 0.50 0.45 0.40

6R ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08

0.6 0.5 0.4 0.3

Gain amp vs UTC time for JVS1349+53.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 29-JUL-2002 14:04:13

1R EF 20 10 0 2R JB 30 20 10 0 3R MC 0.6 0.5 0.4 4R TR 0.6 0.5 0.4 0.3 5R WB

0.50 0.45 0.40 0.35 6R ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08

0.55 0.50 0.45 0.40

Gain amp vs UTC time for JVS1349+53.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 29-JUL-2002 14:04:13

1L EF 15 10 5 0 2L JB 0.5 0.4 0.3 3L MC 0.5 0.4 0.3 4L TR 0.5 0.4 0.3 5L WB

0.55 0.50 0.45 0.40

6L ON

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08

0.6 0.5 0.4 0.3

Gain amp vs UTC time for JVS1349+53.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 29-JUL-2002 14:04:14

1L EF 500 450 400 2L JB 600 500 400 3L MC 600 500 400 300 4L TR 500 400 300 5L WB 500 450 400 350 6L ON

MilliGain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08

600 500 400