Center at RA 13 49 34.65700 DEC 53 41 17.0400

CONT: JVS1349+ IPOL 1656.365 MHZ JVS1349+53.ICL001.3

PLot file version 1 created 29-JUL-2002 14:04:27

Cont peak flux = 1.1074E-01 JY/BEAM Levs = 1.107E-01 * (-0.031, 0.031, 0.061, 0.123, 0.246, 0.491, 0.983)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250