Center at RA 15 06 09.53000 DEC 37 30 51.1300

CONT: JVS1506+ IPOL 1656.365 MHZ JVS1506+37.ICL001.3

PLot file version 1 created 29-JUL-2002 14:02:49

Cont peak flux = 5.5569E-01 JY/BEAM Levs = 5.557E-01 * (-0.027, 0.027, 0.055, 0.109, 0.219, 0.437, 0.874)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250