Center at RA 05 55 30.80561 DEC 39 48 49.1650

CONT: DA193 IPOL 4988.365 MHZ DA193.ICL001.3

PLot file version 1 created 11-JUN-2002 11:29:53

Cont peak flux = 4.8591E+00 JY/BEAM Levs = 4.859E+00 * (-0.013, 0.013, 0.026, 0.052, 0.103, 0.207, 0.414, 0.827)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100