Center at RA 07 07 00.61565 DEC 61 10 11.6073

CONT: J0707+61 IPOL 4988.365 MHZ J0707+6110.ICL001.3

PLot file version 1 created 11-JUN-2002 11:04:27

Cont peak flux = 9.7806E-02 JY/BEAM Levs = 9.781E-02 * (-0.040, 0.040, 0.081, 0.161, 0.322, 0.644)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100