Center at RA 15 21 49.61387 DEC 43 36 39.2680

CONT: J1521+43 IPOL 4988.365 MHZ J1521+4336.ICL001.3

PLot file version 1 created 11-JUN-2002 11:11:20

Cont peak flux = 4.8471E-01 JY/BEAM Levs = 4.847E-01 * (-0.017, 0.017, 0.035, 0.070, 0.140, 0.280, 0.560)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100