Center at RA 22 03 30.95264 DEC 10 07 42.5864

CONT: J2203+10 IPOL 4988.365 MHZ J2203+1007.ICL001.3

PLot file version 1 created 11-JUN-2002 11:14:50

Cont peak flux = 2.0378E-01 JY/BEAM Levs = 2.038E-01 * (-0.030, 0.030, 0.059, 0.118, 0.237, 0.473, 0.947)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100