Center at RA 22 36 22.47086 DEC 28 28 57.4133

CONT: J2236+28 IPOL 4988.365 MHZ J2236+2828.ICL001.3

PLot file version 1 created 11-JUN-2002 11:18:33

Cont peak flux = 1.4025E+00 JY/BEAM Levs = 1.402E+00 * (-0.026, 0.026, 0.052, 0.105, 0.210, 0.420, 0.839)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100