Center at RA 23 29 05.78678 DEC 08 34 15.8542

CONT: J2329+08 IPOL 4988.365 MHZ J2329+0834.ICL001.3

PLot file version 1 created 11-JUN-2002 11:25:41

Cont peak flux = 1.3206E-01 JY/BEAM Levs = 1.321E-01 * (-0.012, 0.012, 0.024, 0.048, 0.095, 0.190, 0.381, 0.761)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100