Tsys vs UTC time for es043a.MSORT.1 TY 1 Rpol IF 1 - 2

Plot file version 1 created 20-APR-2002 08:02:21

1R JB IF 1 80 60 40 1R JB IF 2 100 80 60 2R CM IF 1 140 120 100 80 60 40 2R CM IF 2 140 120 100 80 60 40 3R WB IF 1 85 80 75 70 65 3R WB IF 2

Kelvin

90 80 70 4R EB IF 1 600 400 200 0 4R EB IF 2 600 400 200 0 5R ON IF 1 80 70 60 5R ON IF 2

TIME (HOURS)

05 10 15 20 1/01 1/06

80 70 60

Tsys vs UTC time for es043a.MSORT.1 TY 1 Rpol IF 1 - 2

Plot file version 2 created 20-APR-2002 08:02:22

6R MC IF 1 70 60 50 6R MC IF 2 70 60 50 7R TR IF 1

1.005 1.000 0.995

7R TR IF 2

Kelvin

TIME (HOURS)

05 10 15 20 1/01 1/06

1.005 1.000 0.995

Tsys vs UTC time for es043a.MSORT.1 TY 1 Lpol IF 1 - 2

Plot file version 3 created 20-APR-2002 08:02:25

1L JB IF 1 80 60 40 1L JB IF 2 80 60 40 2L CM IF 1 140 120 100 80 60 40 2L CM IF 2 140 120 100 80 60 40 3L WB IF 1 85 80 75 70 65 3L WB IF 2

Kelvin

90 80 70 4L EB IF 1 600 400 200 0 4L EB IF 2 400 200 0 5L ON IF 1 65 60 55 50 5L ON IF 2

TIME (HOURS)

05 10 15 20 1/01 1/06

65 60 55 50

Tsys vs UTC time for es043a.MSORT.1 TY 1 Lpol IF 1 - 2

Plot file version 4 created 20-APR-2002 08:02:26

6L MC IF 1 70 60 50 6L MC IF 2 70 60 50 7L TR IF 1

1.005 1.000 0.995

7L TR IF 2

Kelvin

TIME (HOURS)

05 10 15 20 1/01 1/06

1.005 1.000 0.995