Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-APR-2003 15:16:05

1R EB

1.05 1.00 0.95 0.90 2R WB 0.95 0.90 0.85 3R JB 0.9 0.8 0.7 4R ON 1.0 0.9 0.8 5R MC 1.3 1.2 1.1 1.0 0.9 7R TR

Gain

TIME (HOURS)

17 18 19 20 21 22 23 1/00

400 200 0

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-APR-2003 15:16:05

1R EB

1000 950 900 2R WB 950 900 850 3R JB

1000 900 800 700 4R ON

1000 900 800 5R MC

1200 1100 1000 900 7R TR

MilliGain

TIME (HOURS)

17 18 19 20 21 22 23 1/00

1400 1200 1000

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 13-APR-2003 15:16:05

1L EB 1.1 1.0 0.9 2L WB

0.90 0.85 0.80

3L JB 0.9 0.8 0.7 4L ON 1.0 0.9 0.8 5L MC 1.2 1.1 1.0 0.9 7L TR

Gain

TIME (HOURS)

17 18 19 20 21 22 23 1/00

1.4 1.2 1.0

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 13-APR-2003 15:16:05

1L EB

1100 1050 1000

2L WB

1000 950 900 3L JB

1200 1100 1000 900 4L ON

1000 900 800 5L MC

1200 1100 1000 900 7L TR

MilliGain

TIME (HOURS)

17 18 19 20 21 22 23 1/00

1400 1200 1000

Gain amp vs UTC time for 1308+326.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-APR-2003 15:16:32

1R EB

0.85 0.80 0.75 0.70

2R WB

0.74 0.72 0.70

3R JB 0.7 0.6 0.5 0.4 4R ON 1.4 1.2 1.00.8 0.60.4

5R MC

0.85 0.80 0.75 0.70

7R TR

Gain

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30 16 00 30

1.0 0.9 0.8 0.7

Gain amp vs UTC time for 1308+326.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-APR-2003 15:16:33

1R EB

0.80 0.75 0.70 0.65

2R WB 1.0 0.9 0.8 0.7 3R JB

1.41.2 1.00.8 0.60.4

4R ON 1.2 1.0 0.8 0.6 0.4 5R MC 0.9 0.8 0.7 7R TR

Gain

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30 16 00 30

1.0 0.8 0.6

Gain amp vs UTC time for 1308+326.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 13-APR-2003 15:16:33

1L EB 850 800 750 700 650 2L WB 700 680 660 640 3L JB 700 600 500 400 4L ON 800 600 400 5L MC 760 740 720 700 680 7L TR

MilliGain

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30 16 00 30

1000 800 600

Gain amp vs UTC time for 1308+326.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 13-APR-2003 15:16:33

1L EB 6 4 2 2L WB

0.75 0.70 0.65

3L JB 1.0 0.8 0.6 0.4 4L ON 0.8 0.6 0.4 5L MC

0.80 0.75 0.70

7L TR

Gain

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30 16 00 30

1.1 1.0 0.9 0.8

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-APR-2003 15:17:04

2R WB

1040 1020 1000

3R JB

1000 980 960 940 4R ON

1200 1100 1000

5R MC

1020 1000 980 7R TR

MilliGain

TIME (HOURS)

16 05 06 07 08 09 10 11 12 13

1050 1000 950 900

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-APR-2003 15:17:04

2R WB

1020

1010

1000

3R JB 965 960 955 950 4R ON 985 980 975 970 5R MC 980 975 970 965 7R TR

MilliGain

TIME (HOURS)

16 05 06 07 08 09 10 11 12 13

980 960 940 920

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 13-APR-2003 15:17:05

2L WB 960 955 950 3L JB 925 920 915 910 4L ON 990 985 980 975 5L MC

1020 1010 1000

7L TR

1050 1000 950 9L SH

MilliGain

TIME (HOURS)

16 05 06 07 08 09 10 11 12 13

1030 1020 1010 1000 990

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 13-APR-2003 15:17:05

2L WB

1032 1030 1028 1026 1024 1022

3L JB

1205 1200 1195 1190 1185

4L ON 985 980 975 5L MC

1005 1000 995 990 985 7L TR 980 960 940 920 9L SH

MilliGain

TIME (HOURS)

16 05 06 07 08 09 10 11 12 13

1040 1020 1000 980 960