Center at RA 00 41 41.29860 DEC 41 03 32.9958

CONT: CAL-A IPOL 4989.506 MHZ CAL-A.ICL001.3

PLot file version 1 created 28-JUL-2005 13:02:10

Cont peak flux = 5.7591E-03 JY/BEAM Levs = 5.759E-03 * (-0.111, 0.111, 0.223, 0.445, 0.891)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100