Center at RA 00 42 51.62232 DEC 41 26 34.3191

CONT: CAL-D IPOL 4989.506 MHZ CAL-D.ICL001.3

PLot file version 1 created 28-JUL-2005 13:02:17

Cont peak flux = 1.1416E-02 JY/BEAM Levs = 1.142E-02 * (-0.093, 0.093, 0.185, 0.370, 0.741)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100