Center at RA 17 33 02.70579 DEC -13 04 49.5482

CONT: J1733-13 IPOL 1611.790 MHZ J1733-1304.ICL001.5

PLot file version 1 created 29-SEP-2005 19:29:19

Cont peak flux = 3.5855E+00 JY/BEAM Levs = 3.586E+00 * (-0.015, 0.015, 0.031, 0.061, 0.122, 0.244, 0.489, 0.978)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250