Center at RA 22 53 57.74794 DEC 16 08 53.5609

CONT: J2253+16 IPOL 1611.790 MHZ J2253+1608.ICL001.5

PLot file version 1 created 29-SEP-2005 19:29:26

Cont peak flux = 1.0388E+01 JY/BEAM Levs = 1.039E+01 * (-0.016, 0.016, 0.032, 0.064, 0.127, 0.255, 0.509)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250