Center at RA 06 55 10.02473 DEC 41 00 10.1599

CONT: J0655+41 IPOL 1658.006 MHZ J0655+4100.IIM001.1

PLot file version 1 created 01-DEC-2005 16:47:40

Cont peak flux = 2.8632E-01 JY/BEAM Levs = 2.863E-01 * (-0.192, 0.192, 0.385, 0.770)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250