Center at RA 06 55 10.02473 DEC 41 00 10.1599

CONT: J0655+41 IPOL 1658.006 MHZ J0655+4100.IIM001.2

PLot file version 1 created 01-DEC-2005 16:48:27

Cont peak flux = 2.7842E-01 JY/BEAM Levs = 2.784E-01 * (-0.045, 0.045, 0.091, 0.181, 0.363, 0.725)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250