Center at RA 09 05 30.12770 DEC 34 07 56.0930

CONT: 0902+34 IPOL 1658.006 MHZ 0902+34.IIM001.2

PLot file version 1 created 18-JAN-2006 21:21:33

Cont peak flux = 6.6475E-03 JY/BEAM Levs = 6.648E-03 * (-0.326, 0.326, 0.652)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250