Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 19-JAN-2006 18:53:10

1 JB IF 1R 1.7 1.6 1.5 1 JB IF 1L

1.825 1.820 1.815 1.810 1 JB IF 2R 3.0 2.5 2.0 1.5 1 JB IF 2L 3 2 1 1 JB IF 3L

4.395 4.390 4.385 4.380 1 JB IF 4R

Gain

2.5 2.0 1.5 1 JB IF 4L 2.0 1.8 1.6 1.4 1.2 1 JB IF 5R 1.5 1.0 0.5 1 JB IF 5L 1.6 1.4 1.2 1 JB IF 6L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

2.710 2.705 2.700 2.695

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 19-JAN-2006 18:53:10

2 WB IF 1R 1.5 1.0 2 WB IF 1L

0.485 0.480 0.475 0.470 2 WB IF 2R

4.210 4.205 4.200 4.195 2 WB IF 2L 12 11 10 2 WB IF 3L

7.990 7.985 7.980 7.975 2 WB IF 4R

Gain

0.580 0.575 0.570 0.565

2 WB IF 4L

0.555 0.550 0.545 0.540

2 WB IF 5L 1.0 0.8 0.6 0.4 2 WB IF 6L

0.540 0.535 0.530 0.525 3 EB IF 1L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

10.135 10.130 10.125 10.120

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 19-JAN-2006 18:53:10

3 EB IF 2L 1.6 1.4 1.2 1.0 0.8 3 EB IF 3L 1.4 1.2 1.0 0.8 3 EB IF 4L 1.6 1.4 1.2 3 EB IF 5L

1.650 1.645 1.640 1.635

3 EB IF 6L

1.290 1.285 1.280 1.275 4 ON IF 1R

Gain

7.005 7.000 6.995 6.990 4 ON IF 2L

7.200 7.195 7.190 7.185 4 ON IF 3L

2.210 2.205 2.200 2.195

5 MC IF 1R

3.115 3.110 3.105 3.100

5 MC IF 1L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

2.700 2.695 2.690 2.685

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 19-JAN-2006 18:53:10

5 MC IF 2L

7.045 7.040 7.035 7.030

5 MC IF 3L

6.140 6.135 6.130 6.125 5 MC IF 4L

0.360 0.355 0.350 0.345

5 MC IF 5L

0.765 0.760 0.755 0.750

6 TR IF 1R 4.8 4.6 4.4 4.2 4.0 6 TR IF 1L

Gain

2.5 2.0 1.5 1.0 0.5 6 TR IF 3L

2.425 2.420 2.415 2.410

9 CM IF 4R

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

2.095 2.090 2.085 2.080