Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 19-JAN-2006 18:52:53

1 JB IF 1R

0.010 0.005 0.000 -0.005

1 JB IF 1L

0.010 0.005 0.000 -0.005

1 JB IF 2R

0.010 0.005 0.000 -0.005

1 JB IF 2L

0.010 0.005 0.000 -0.005

1 JB IF 3R

0.010 0.005 0.000 -0.005

1 JB IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 JB IF 4R

0.010 0.005 0.000 -0.005

1 JB IF 4L

0.010 0.005 0.000 -0.005

1 JB IF 5R

0.010 0.005 0.000 -0.005

1 JB IF 5L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 19-JAN-2006 18:52:53

1 JB IF 6R

0.010 0.005 0.000 -0.005

1 JB IF 6L

0.010 0.005 0.000 -0.005

1 JB IF 7R

0.010 0.005 0.000 -0.005

1 JB IF 7L

0.010 0.005 0.000 -0.005

1 JB IF 8R

0.010 0.005 0.000 -0.005

1 JB IF 8L

Degrees

0.010 0.005 0.000 -0.005

2 WB IF 1R 100 0 -100 -200 2 WB IF 1L 350 300 250 200 150 2 WB IF 2R 200 100 0 2 WB IF 2L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

200 100 0

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 19-JAN-2006 18:52:53

2 WB IF 3R 100 0 -100

2 WB IF 3L 100 0 -100

2 WB IF 4R 200 100 0 2 WB IF 4L 200 100 0 2 WB IF 5R 0 -50 -100 -150

2 WB IF 5L

Degrees

200 100 0 2 WB IF 6R 0 -50 -100 -150

2 WB IF 6L 200 100 0 2 WB IF 7R 0 -50 -100 -150

2 WB IF 7L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

0 -50 -100 -150

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 19-JAN-2006 18:52:53

2 WB IF 8R 0 -50 -100 -150

2 WB IF 8L 0 -50 -100 -150

3 EB IF 1L 50 0 -50 3 EB IF 2L 20 0 -20 -40 3 EB IF 3L 100 50 0 3 EB IF 4L

Degrees

100 50 0 3 EB IF 5L 60 40 20 3 EB IF 6L 60 40 20 4 ON IF 1R 136 134 132 130 4 ON IF 1L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

139 138 137

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 19-JAN-2006 18:52:53

4 ON IF 2R 100 50 0 -50 4 ON IF 2L 100 50 0 4 ON IF 3R 100 50 0 4 ON IF 3L -10 -15 -20 4 ON IF 4R 0 -10 -20 4 ON IF 4L

Degrees

350 345 340 4 ON IF 5R 20 0 -20 4 ON IF 5L -16 -18 -20 -22 4 ON IF 6R -5 -6 -7 -8 -9 4 ON IF 6L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

-8 -10 -12

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 19-JAN-2006 18:52:53

4 ON IF 7R -2 -4 -6 4 ON IF 7L -4 -6 -8 4 ON IF 8R 357 356 355 354 4 ON IF 8L -4 -5 -6 -7 5 MC IF 1R

-33.970 -33.975 -33.980 -33.985

5 MC IF 1L

Degrees

0 -5 -10 5 MC IF 2L 12 10 8 6 5 MC IF 3L

2.650 2.645 2.640 2.635

5 MC IF 4R 100 50 0 -50 5 MC IF 4L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

100 50 0 -50

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 19-JAN-2006 18:52:53

5 MC IF 5R 100 50 0 -50 5 MC IF 5L 100 50 0 -50 5 MC IF 6R

81.630 81.625 81.620 81.615

5 MC IF 6L 80 60 40 20 0 5 MC IF 7R

74.125 74.120 74.115 74.110

5 MC IF 7L

Degrees

-87.385 -87.390 -87.395 -87.400

6 TR IF 1R 150 100 50 0 -50 6 TR IF 1L 0 -10 -20 -30 6 TR IF 2R 100 0 -100

6 TR IF 2L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

0 -20 -40 -60 -80

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 19-JAN-2006 18:52:53

6 TR IF 3L 150 100 50 6 TR IF 4L 40 35 30 25 6 TR IF 5L

66.320 66.315 66.310 66.305

6 TR IF 6L

66.435 66.430 66.425 66.420

9 CM IF 4R 100 50 0 9 CM IF 4L

Degrees

100 50 0 9 CM IF 5R 100 50 0 9 CM IF 5L

TIME (HOURS)

19 50 20 00 10 20 30 40 50 21 00 10

100 50 0