Center at RA 09 11 47.76148 DEC 33 49 16.7941

CONT: J0911+33 IPOL 1658.006 MHZ J0911+3349.ICL001.5

PLot file version 1 created 20-JAN-2006 10:52:09

Cont peak flux = 4.8625E-01 JY/BEAM Levs = 4.863E-01 * (-0.061, 0.061, 0.122, 0.244, 0.488, 0.976)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250