Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 26-MAY-2021 15:14:02

1 JB IF 1R 300 200 100 1 JB IF 1L 200 100 0 -100

1 JB IF 2R 300 200 100 0 1 JB IF 2L 100 0 -100 1 JB IF 3R 100 0 -100 -200 1 JB IF 3L

Degrees

100 0 -100 -200 1 JB IF 4R 100 0 -100

1 JB IF 4L 100 0 -100

1 JB IF 5R 200 0 -200 1 JB IF 5L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 26-MAY-2021 15:14:02

1 JB IF 6R 100 0 -100 1 JB IF 6L 200 100 0 -100

1 JB IF 7R 200 100 0 -100

1 JB IF 7L 100 0 -100

1 JB IF 8R 200 100 0 -100

1 JB IF 8L

Degrees

200 0 -200 2 EF IF 1R

0.001

0.000

-0.001 2 EF IF 1L

0.001

0.000

-0.001 2 EF IF 2R

0.001

0.000

-0.001 2 EF IF 2L

Time (hours)

08 09 10 11 12 13 14 15

0.001

0.000

-0.001

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 26-MAY-2021 15:14:02

2 EF IF 3R 1 0 -1 2 EF IF 3L 1 0 -1 2 EF IF 4R 1 0 -1 2 EF IF 4L 1 0 -1 2 EF IF 5R 1 0 -1 2 EF IF 5L

MilliDegrees

1 0 -1 2 EF IF 6R 1 0 -1 2 EF IF 6L 1 0 -1 2 EF IF 7R 1 0 -1 2 EF IF 7L

Time (hours)

08 09 10 11 12 13 14 15

1 0 -1

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 26-MAY-2021 15:14:02

2 EF IF 8R 1 0 -1 2 EF IF 8L 1 0 -1 3 MC IF 1R

100000 0 -100000

3 MC IF 1L

200000 100000 0 -100000 -200000

3 MC IF 2R

200000 100000 0 -100000 -200000

3 MC IF 2L

MilliDegrees

200000 100000 0 -100000

3 MC IF 3R

200000 100000 0 -100000

3 MC IF 3L

200000 100000 0 -100000

3 MC IF 4R

200000 100000 0 -100000 -200000

3 MC IF 4L

Time (hours)

08 09 10 11 12 13 14 15

200000 100000 0 -100000

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 26-MAY-2021 15:14:02

3 MC IF 5R 200 0 -200

3 MC IF 5L 100 0 -100

3 MC IF 6R 200 0 -200

3 MC IF 6L 200 100 0 -100

3 MC IF 7R 200 0 -200

3 MC IF 7L

Degrees

100 0 -100 -200

3 MC IF 8R 200 100 0 -100

3 MC IF 8L 200 0 -200

4 O6 IF 1R 100 0 -100

4 O6 IF 1L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 26-MAY-2021 15:14:02

4 O6 IF 2R 100 0 -100 -200

4 O6 IF 2L 200 0 -200

4 O6 IF 3R 100 0 -100

4 O6 IF 3L 200 0 -200

4 O6 IF 4R 200 0 -200

4 O6 IF 4L

Degrees

200 0 -200

4 O6 IF 5R 100 0 -100

4 O6 IF 5L 100 0 -100

4 O6 IF 6R 200 100 0 -100

4 O6 IF 6L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 26-MAY-2021 15:14:02

4 O6 IF 7R 100 0 -100

4 O6 IF 7L 100 0 -100 -200

4 O6 IF 8R 100 0 -100

4 O6 IF 8L 100 0 -100

7 TR IF 1R 100 0 -100

7 TR IF 1L

Degrees

100 0 -100

7 TR IF 2R 150 100 50 0 -50 7 TR IF 2L 0 -50 -100

7 TR IF 3R 150 100 50 0 7 TR IF 3L

Time (hours)

08 09 10 11 12 13 14 15

100 50 0 -50

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 26-MAY-2021 15:14:02

7 TR IF 4R 100 0 -100

7 TR IF 4L 200 100 0 7 TR IF 5R 150 100 50 0 7 TR IF 5L 100 50 0 7 TR IF 6R 0 -50 -100

7 TR IF 6L

Degrees

50 0 -50 7 TR IF 7R 10 0 -10 7 TR IF 7L 100 0 -100

7 TR IF 8R 150 100 50 0 7 TR IF 8L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 26-MAY-2021 15:14:02

9 HH IF 1R 200 0 -200

9 HH IF 1L 200 0 -200

9 HH IF 2R 100 0 -100 -200

9 HH IF 2L 100 0 -100

9 HH IF 3R 300 200 100 0 9 HH IF 3L

Degrees

100 0 -100 -200

9 HH IF 4R 100 0 -100 -200

9 HH IF 4L 300 200 100 0 9 HH IF 5R 200 0 -200

9 HH IF 5L

Time (hours)

08 09 10 11 12 13 14 15

200 0 -200

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 26-MAY-2021 15:14:02

9 HH IF 6R 200 0 -200

9 HH IF 6L 100 0 -100 -200

9 HH IF 7R 200 0 -200

9 HH IF 7L 300 200 100 0 9 HH IF 8R 200 0 -200

9 HH IF 8L

Degrees

300 200 100 0 10 SV IF 1R 100 0 -100

10 SV IF 1L 150 100 50 0 10 SV IF 2R 50 0 -50 -100 -150

10 SV IF 2L

Time (hours)

08 09 10 11 12 13 14 15

150 100 50 0 -50

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 26-MAY-2021 15:14:02

10 SV IF 3R 100 50 0 -50 10 SV IF 3L 200 100 0 -100

10 SV IF 4R 150 100 50 0 -50 10 SV IF 4L 100 0 -100

10 SV IF 5R 100 0 -100

10 SV IF 5L

Degrees

100 0 -100

10 SV IF 6R 100 50 0 -50 10 SV IF 6L 100 50 0 -50 10 SV IF 7R -20 -40 -60 -80 -100 -120

10 SV IF 7L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 12 created 26-MAY-2021 15:14:02

10 SV IF 8R 250 200 150 100 50 10 SV IF 8L 50 0 -50 11 ZC IF 1R 100 0 -100

11 ZC IF 1L 300 200 100 0 11 ZC IF 2R 100 0 -100 -200

11 ZC IF 2L

Degrees

100 0 -100

11 ZC IF 3R 300 200 100 11 ZC IF 3L 50 0 -50 -100

11 ZC IF 4R 300 200 100 11 ZC IF 4L

Time (hours)

08 09 10 11 12 13 14 15

300 200 100 0

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 15 created 26-MAY-2021 15:14:02

13 SR IF 6R 100 0 -100 -200 13 SR IF 6L 200 0 -200 13 SR IF 7R 200 0 -200 13 SR IF 7L 100 0 -100 -200 13 SR IF 8R 100 0 -100 -200 13 SR IF 8L

Degrees

200 100 0 -100

14 MH IF 1R 100 0 -100 -200 14 MH IF 1L 100 0 -100 -200 14 MH IF 2R 100 0 -100

14 MH IF 2L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 16 created 26-MAY-2021 15:14:02

14 MH IF 3R 50 0 -50 -100 -150

14 MH IF 3L 200 0 -200 14 MH IF 4R 100 0 -100

14 MH IF 4L 40 20 0 -20 -40 -60 14 MH IF 5R 150 100 50 0 -50 14 MH IF 5L

Degrees

100 0 -100

-200 14 MH IF 6R 50 0 -50 -100 -150

14 MH IF 6L 200 100 0 -100

14 MH IF 7R 100 0 -100

14 MH IF 7L

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100

Gain phs vs UTC time for J2232-1659.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 17 created 26-MAY-2021 15:14:02

14 MH IF 8R 100 0 -100

14 MH IF 8L

Degrees

Time (hours)

08 09 10 11 12 13 14 15

100 0 -100