Gain amp vs UTC time for ev012b.MSORT.1 CL 2 Rpol IF 1

Plot file version 1 created 16-OCT-2002 13:38:10

1R EF 6.0 5.5 5.0 2R MC

28.5 28.0 27.5

3R JB 370 360 350 340 5R TR

13.8 13.6 13.4 13.2 13.0 12.8

6R CM

Gain

TIME (HOURS)

08 10 12 14 16 18 20

343.785 343.780 343.775 343.770

Gain amp vs UTC time for ev012b.MSORT.1 CL 2 Lpol IF 1

Plot file version 2 created 16-OCT-2002 13:38:10

1L EF 5.6 5.4 5.2 5.0 4.8 4.6 2L MC 29 28 27 3L JB 360 350 340 5L TR

14.2 14.0 13.8 13.6 13.4 13.2 6L CM

Gain

TIME (HOURS)

08 10 12 14 16 18 20

343.785 343.780 343.775 343.770