Center at RA 20 22 06.68168 DEC 61 36 58.8047

CONT: J2022+61 IPOL 6668.100 MHZ J2022+61.ICL001.3

PLot file version 1 created 16-OCT-2002 13:47:29

Cont peak flux = 6.0968E-01 JY/BEAM Levs = 6.097E-01 * (-0.018, 0.018, 0.036, 0.072, 0.144, 0.288, 0.575)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100