Tsys vs UTC time for ev012.MSORT.1 TY 1 Rpol IF 1

Plot file version 1 created 18-NOV-2002 11:13:49

1R EF 60 50 40 30 2R MC 140 130 120 3R JB 80 75 70 4R ON

112110 108106 104102

6R CM

Kelvin

TIME (HOURS)

12 14 16 18 20 22 1/00 1/02

1.005 1.000 0.995

Tsys vs UTC time for ev012.MSORT.1 TY 1 Lpol IF 1

Plot file version 2 created 18-NOV-2002 11:13:49

1L EF 60 40 20 2L MC 140 130 120 110 3L JB

7876 7472 7068

4L ON

112110 108106 104102

6L CM

Kelvin

TIME (HOURS)

12 14 16 18 20 22 1/00 1/02

1.005 1.000 0.995