Center at RA 14 35 40.00000 DEC -04 14 56.0000

CONT: 1433-040 IPOL 4988.365 MHZ 1433-040.IIM001.2

PLot file version 1 created 27-MAY-2005 17:44:17

Cont peak flux = 1.3174E-01 JY/BEAM Levs = 1.317E-01 * (-0.125, 0.125, 0.250, 0.500)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100